10 10^2

⟨N_{part}⟩

33.54 4.555.5 66.57 7.5

σ_{dNch/dy}

ALICE, √ s_{NN} = 5.02 TeV

DATAEPOS-LHC dN_{ch}/dy EPOS-LHC

10 10^2

⟨N_{part}⟩

1.41.61.8 22.22.4 2.62.8

Effective p_T/m (c)

0.30.35 0.40.45 0.50.55 0.6

Effective p_T/m × ⟨m⟩ (GeV/c)

ppp–Pb

Pb–Pb⟨p_T⟩/⟨m⟩|_{|y|<0.5} EPOS-LHC

ALI-PUB-561292